26 26.5 27 27.5 28 28.5 29 29.5 deg. C

ADCP -NB150/ (mean = magenta; last = blk)

250 255 260 265 270

-0.2

-0.1

0

0.1

0.2

decimal days

(Mean - Last) Difference