29 29.2

29.4

29.6

29.8 30 30.2

30.4

30.6 deg. C

ADCP -OS75BB (mean = magenta; last = blk)

194 195 196 197 198 199 200 201 202 203

-0.2

-0.1

0

0.1

0.2

decimal days

(Mean - Last) Difference