10 12 14 16 18 20 22 24 26 deg. C

ADCP -OS150N (mean = magenta; last = blk)

226 227 228 229 230 231 232 233 234

-0.2

-0.1

0

0.1

0.2

decimal days

(Mean - Last) Difference