24 24.5 25 25.5 26 26.5 27 27.5 deg. C

ADCP -OS150N (mean = magenta; last = blk)

108 110 112 114 116 118 120

-0.2

-0.1

0

0.1

0.2

decimal days

(Mean - Last) Difference