26 26.5 27 27.5 28 28.5 29 29.5 deg. C

ADCP -OS75BB (mean = magenta; last = blk)

58 60 62 64 66 68 70 72 74 76 78

-0.2

-0.1

0

0.1

0.2

decimal days

(Mean - Last) Difference