23 23.2

23.4

23.6

23.8 24 24.2

24.4

24.6

24.8 deg. C

ADCP -WH300/ (mean = magenta; last = blk)

47 47.5 48 48.5 49 49.5 50 50.5

-0.2

-0.1

0

0.1

0.2

decimal days

(Mean - Last) Difference