23.5

24

24.5

25

25.5 deg. C

ADCP -OS38NB (mean = magenta; last = blk)

38 38.5 39 39.5 40 40.5 41 41.5 42 42.5

-0.2

-0.1

0

0.1

0.2

decimal days

(Mean - Last) Difference