#!/usr/bin/perl5

print <<EndOfFile;
Content-type: text/html

<FORM>
<H2>T1 Configuration</H2>
<P>
The GIO syncronous communication board has two connectors that can be used
for connection to a T1 line. Only one of these lines should be in use at
one time.
<P>
<STRONG>Enable T1:</STRONG> Specifies whether a T1 line is connected to
this port. Select <VAR>Yes</VAR> to specify that this line is in use; 
select <VAR>No</VAR> to specify that nothing is connected.
(Default value: No)
<P>
<STRONG>Port:</STRONG> Specifies the port number on the GIO Sync board
that the T1 line is connected into.
(Default value: Port 1)
<P>
<STRONG>Connection name for remote system:</STRONG> This is an arbitrary
one-word name for the connection. Typically, your entry is the
hostname of the system to which you plan to connect. 
(Default value: none) 
<CENTER>
<INPUT TYPE="button" VALUE="Back to Form" onClick="self.history.go(-1)">
</CENTER>
</FORM>
EndOfFile
