#!/usr/bin/perl5

print <<EndOfFile;
Content-type: text/html

<FORM>
<H2>Dial-out PPP Accounts</H2>
<P>
This form allows you to modify a dial-out modem account to use PPP
on the line. To use this form, you must have already created a modem 
account (see the <VAR>Modem Accounts</VAR> form in the <VAR>Modems</VAR>
product page). This form changes the <VAR>/etc/ppp.conf</VAR>
configuration file to set the new PPP parameters.
<P>
Use the Dial-out PPP Accounts form to set the following PPP parameters:
<P>
<STRONG>Edit Selected Account</STRONG> This list contains the names
of dial-out PPP accounts. To change an account, select it and click
the <VAR>Edit Selected Account</VAR> button to display the Edit Dial-out
PPP Account form. When you finish your changes, click the <VAR>Ok</VAR> 
button to put the changes in effect.
</P>
(Default value: none)
<P>
<STRONG>Connection name:</STRONG> This information field displays the 
connection name that you selected.
</P>
(Default value: none)
<P>
<STRONG>Hardware:</STRONG> This information field identifies the type
of line used in the connection to the remote system: modem, ISDN, or T1. 
</P>
(Default value: none)
<P>
<STRONG>IP address of local host:</STRONG> This selection shows 
the address of the PPP connection on the Internet Gateway system.
</P>
(Default value: none)
<P>
<STRONG>IP address of remote host:</STRONG> Enter the Internet address of 
the remote system in dotted decimal (such as 1.2.3.4) or hexadecimal 
(such as 0x01020304) notation.
</P>
(Default value: none)
<P>
<STRONG>Login name on remote host:</STRONG> Sometimes, two different logins
are needed to communicate with a remote system: a dial-in login, which
you specify on the <VAR>Modem Accounts</VAR> form, and the PPP login, which
is required for PPP authentication. Enter the name to be used for PPP 
authentication. 
</P>
(Default value: none)
<P>
<STRONG>Password on remote host:</STRONG> Sometimes, two different passwords 
are needed to communicate with a remote system, a dial-in password, which you
specified in the <VAR>Modem Accounts</VAR> form, and a PPP password, which
is required for PPP authentication. Enter the password to be used during the 
PPP authentication phase. 
</P>
(Default value: none)
<P>
<STRONG>Add default route to remote host:</STRONG> This selection specifies
whether a default route should be added to the kernel routing table when this 
line is activated. If a default route is added, all network packets that are
not bound for a local network are sent across the PPP connection.
</P>
(Default value: No)
<P>
<STRONG>Disconnect when PPP line is idle:</STRONG> Specifies whether 
the line is automatically activated or dropped when needed. This is useful 
when system use is sporadic. If you select <VAR>Yes</VAR>, the remote system 
is automatically dialed when there is traffic bound for it, and it is automatically
dropped after it has been idle for a reasonable amount of time.
(Default value: No) 
<CENTER>
<INPUT TYPE="button" VALUE="Back to Form" onClick="self.history.go(-1)">
</CENTER>
</FORM>
EndOfFile
