#!/usr/bin/perl5

print <<EndOfFile;
Content-type: text/html

<FORM>
<H2>Dial-in PPP Accounts</H2>
<P>
This form allows you to add support for other systems to connect to
the Internet Gateway by means of a modem or ISDN, running PPP over the 
line. This form adds a line for the new account to the <VAR>/etc/passwd</VAR> 
file and modifies the <VAR>/etc/ppp.conf</VAR> with parameters for this 
connection.
<P>
Use the Dial-in PPP Accounts form to set the following parameters:
<P>
<STRONG>Add New Account</STRONG> This field specifies the name of the 
account that will be used for PPP connections. Enter a login name for 
the new account and click the <VAR> Add New Account</VAR> button to
display the Add New Dial-in PPP Account form. When you complete this
form, click the <VAR>Ok</VAR> button to put the changes in effect.
</P>
(Default value: none)
<P>
<STRONG>Edit Selected Account</STRONG> This list contains the names of
all current PPP accounts (the list is empty if you have no accounts). 
Select a login name in the list to display the Edit PPP Accounts form.
When you complete the form, click the <VAR>Ok</VAR> button to put your 
changes in effect.
</P>
(Default value: none)
<P>
<STRONG>Delete Selected Account</STRONG> Select an account name in the
list and click this button to remove the name from the list. You must 
click the <VAR>Ok</VAR> button to put your changes in effect.
</P>
(Default value: none)
<P>
<STRONG>Login name:</STRONG> This is the login name that the remote system
must specify to open a connection to this system. Enter a login name; do not
include spaces or punctuations in your entry. Your entry must contain no more
than eight letters.
</P>
(Default value: none)
<P>
<STRONG>Password: and (Password again):</STRONG> Enter a password for
this account; then, enter the identical password in the entry field below to
verify that your original entry is not misspelled. Passwords should contain 
at least six characters (only the first eight are used): a minimum of two 
alphabetic characters and at least one numeric or special character. The 
password should contain at least three characters that are different from 
the login name. 
</P>
(Default value: none)
<CENTER>
<INPUT TYPE="button" VALUE="Back to Form" onClick="self.history.go(-1)">
</CENTER>
</FORM>
EndOfFile
