#!/usr/bin/perl5

print <<EndOfFile;
Content-type: text/html

<FORM>
<H2>Modem Account Configuration</H2>
<P>
The IRIX operating system controls all dial-out modem functions
through the configuration file <VAR>/etc/uucp/Systems</VAR>. This 
file contains the phone numbers and speeds for dialing remote sites, 
and it also contains a chat script to handle the login process. The 
chat script contains a series of expect/send phrases. This form 
creates a line in the <VAR>Systems</VAR> configuration file with
a default format. 

<STRONG>Note:</STRONG> You might need to edit the <VAR>Systems</VAR>
file directly if the login process on the remote host is not standard.
</P>
<P>
<STRONG>Add New Account</STRONG> This field contains the name for this 
dial-out modem connection, which is normally the name of the remote
host receiving the call. Enter the connection name; do not use spaces
or punctuation characters in your entry (only the first eight letters
of the connection name are used). After your entry, click the <VAR>Add 
New Account</VAR> button to display the Modem Account Configuration
form. When you complete this form, click <VAR>Ok</VAR> to put the changes
in effect. 
</P>
(Default value: none)
<P>
<STRONG>Edit Selected Account</STRONG> This list contains the connection
name for each active modem account. Select a connection name from 
the list, then click the <VAR>Edit New Account</VAR> button to display
the Edit Modem Account form. Make your changes to this form and
click the <VAR>Ok</VAR> button put the changes in effect.
</P>
(Default value: none)
<P>
<STRONG>Delete Selected Account</STRONG> Select a connection name from
the list to the right and click this button to remove a modem account
from the list. Then click the <VAR>Ok</VAR> button to put the removal 
in effect.
</P>
(Default value: none)
<P>
<STRONG>Remote host name:</STRONG> This is the name of the party that
will answer modem calls; by convention, it is the name of a remote
system. The remote hostname in your entry must not contain spaces or 
punctuation (only the first eight characters of this name are used). 
</P>
(Default value: none)
<P>
<STRONG>Phone number:</STRONG> Enter the phone number for the modem line
on the remote system. This is a sequence of numbers with no punctuation
(if you enter punctuation characters, they are removed).
</P>
(Default value: none)
<P>
<STRONG>Login name:</STRONG> A login name is normally assigned when 
you open a modem account on the remote system. Enter this login name;
it should contain no more than eight characters. 
</P>
(Default value: none)
<P>
<STRONG>Password:</STRONG> A password is normally issued when you 
open a modem account on the remote system. Enter the password for this 
account. 
</P>
(Default value: none)
<P>
<STRONG>Baud rate:</STRONG> This is the transmission speed that will
be used for the connection. Select the maximum speed at which your local
modem can operate. A modem of this speed should already be installed 
on your system (instructions are given in ``Installing a Modem'' in 
<VAR>IRIX Admin: Peripheral Devices</VAR>. 
</P>
(Default value: none)
<CENTER>
<INPUT TYPE="button" VALUE="Back to Form" onClick="self.history.go(-1)">
</CENTER>
</FORM>
EndOfFile
