Maui (Pailolo) Aanderaa (220m instrument, 235m total depth)
Sep. 27, 1994 - Apr. 26, 1996
Latitude: 21 deg. 3.27' N
Longitude: 156 deg. 43.6' W

Note: bad data after 180 days (rotor appears fouled)
